arXiv:1509.01600v2 [cs.IT] 24 Sep 2015

K-Means Fingerprint Clustering for Low-Complexity Floor Estimation in Indoor Mobile Localization

Alireza Razavi, Mikko Valkama, and Elena-Simona Lohan Department of Electronics and Communications Engineering, Tampere University of Technology, Tampere, Finland email: alireza.razavi@tut.fi, mikko.e.valkama@tut.fi, elena-simona.lohan@tut.fi

Abstract—Indoor localization in multi-floor buildings is an important research problem. Finding the correct floor, in a fast and efficient manner, in a shopping mall or an unknown university building can save the users’ search time and can enable a myriad of Location Based Services in the future. One of the most widely spread techniques for floor estimation in multi-floor buildings is the fingerprinting-based localization using Received Signal Strength (RSS) measurements coming from indoor networks, such as WLAN and BLE (Bluetooth Low Energy). The clear advantage of RSS-based floor estimation is its ease of implementation on a multitude of mobile devices at the Application Programming Interface (API) level, because RSS values are directly accessible through API interface. However, the downside of a fingerprinting approach, especially for largescale floor estimation and positioning solutions, is their need to store and transmit a huge amount of fingerprinting data. The problem becomes more severe when the localization is intended to be done on mobile devices (smart phones, tablets, etc.) which have limited memory, power, and computational resources. An alternative floor estimation method, which has lower complexity and is faster than the fingerprinting is the Weighted Centroid Localization (WCL) method. The trade-off is however paid in terms of a lower accuracy than the one obtained with traditional fingerprinting with Nearest Neighbour (NN) estimates. In this paper a novel K-means -based method for floor estimation via fingerprint clustering of WiFi and various other positioning sensor outputs is introduced. Our method achieves a floor estimation accuracy close to the one with NN fingerprinting, while significantly improves the complexity and the speed of the floor detection algorithm. The decrease in the database size is achieved through storing and transmitting only the cluster heads (CH’s) and their corresponding floor labels. The performance of the proposed methods is evaluated using reallife indoor measurements taken from four multi-floor buildings. The numerical results show that the proposed K-means -based method offers an excellent trade-off between the complexity and performance.

Keywords—floor estimation, indoor localization, received signal strength (RSS), z-coordinate estimation, fingerprinting localization, clustering, weighted centroid localization.

I. INTRODUCTION

Indoor localization and floor estimation in multi-floor buildings are becoming more and more important in today’s wireless world. Being able to achieve accurate ubiquitous localization on hand-held battery-operating mobile devices in both indoor and outdoor environments would open the window to many new Location Based Services (LBS) spanning from person and asset tracking and personal navigation to health remote monitoring and LBS-based social networking. However, despite the fact that outdoor global localization solutions exist nowadays with the help of Global Navigation Satellite

Systems (GNSS), global solutions for indoor localization and floor estimation are still hard to find.

One of the crucial aspects in indoor positioning is to accurately identify the floor where the user is located. False floor estimation could lead not only to waste of time, for example in Location Based Services dedicated to advertising and shopping assistance, but also to serious injury or loss of lives in emergency Location Based Services. The floor detection or estimation can be either performed in an initial step, before accurate x-y localization, or jointly with the x-y localization [1], [2]. In our paper we focus on the first case.

Typically, the floor estimation is achieved via fingerprinting approaches with Nearest Neighbor (NN) method, and such approaches can solve the indoor localization problem locally, as Skyhook and Polaris have proved [26]. Such solutions are however expensive and computationally rather expensive to be used on a global scale (e.g. worldwide). In the fingerprinting-based methods [7], [12], [18], [19], [21], the location service providers construct a fingerprint database, transfer this database to the Mobile Station (MS), and the MS then computes its location and corresponding floor based on similar fingerprints. The fingerprint databases are typically very large since they do contain Received Signal Strengths (RSS’s) coming from various Access Points (APs) and in many points or coordinates within a building. Thus, if a global floor estimation solution would use a fingerprinting approach, the fingerprint database transfered from the server to the MS would include the fingerprints from all essential buildings in the town (or the location area) where the mobile is situated. For example, assuming that i) we hear an average of 30 APs in each location point inside a building (a location point here refers to the (x, y, z) coordinates inside a building where a measurement is done), ii) we take measurements from an average of 600 location points per building and iii) there are 25 important buildings (malls, shopping centers, hospitals, airports, ...) in the location area where the mobile was identified by the network, then a total of 495000 parameters would need to be stored in the database pertaining to that town and transfered to the mobile. The parameters are the fingerprints, namely the (x, y, z) coordinates and the measured RSS values per coordinate (one RSS per each AP heard at that coordinate). In addition, if these parameters are saved with a 32-bit accuracy, the database size of such a server provider for the particular town of our example would be around 15.86 Mbits. With average typical cell-edge (coverage) rates in the order of 50-100kbps, especially in legacy networks, the transfer to the mobile would take several minutes, which is clearly unacceptable. Moreover, the server would have to deal with hundreds or thousands of user requests for localization, and this could thus easily create a bottleneck also on the server side.

An alternative floor estimation approach is based only on the known or estimated positions of the transmitters or APs and some form of trilateration [3], [4]. The simplest of such approaches is a weighted centroid approach, described for example in [4], [5], [6]. While the complexity of such an approach is much less than the one of the NN fingerprinting, their performance leaves a lot to be desired.

Thus to solve the problem of huge databases and to increase the estimation speed, while still achieving high floor detection probabilities, we propose in this paper a novel clustering method, which achieves and outperforms the floor detection probability of NN fingerprinting, but with much lower complexity. The proposed approach is not limited to the WiFi fingerprints, but rather can be applied to the data collected from various other wireless technologies that support RSS measurements, such as cellular data, BLE data, RFID data, etc.

Related works and the novelty of our work: Clustering of the fingerprints has been already studied in several papers [13], [16], [22], [24], [25]. In all of these papers, the idea is to divide the fingerprints into several clusters where the size of each cluster is much smaller than the whole set of fingerprints. Then the positioning phase includes two stages: first, the MS observation vector is compared to all CH’s, and after finding the most similar cluster, in the second stage the comparisons are done within that cluster. In other words, the whole fingerprinting data is needed for localization. One cannot solely rely on the CH’s to perform the positioning task. This might not be a problem when the localization task is carried out in the server side as normally servers have powerful processing capability and sufficient power supply, but if the mobile device itself wants to accomplish the positioning task, then the server has to send its whole data to the mobile device which is impractical because of both the transmission of the huge dataset and limited processing capability and power supply on mobile devices [27].

To the best of our knowledge, the method proposed in this paper is the only attempt in clustering the fingerprinting data which needs only the CH’s information for z-coordinate positioning task and therefore is implementable on mobile devices. A more detailed comparison between our proposed clustering method and the existing clustering methods for localization will be given in Section III-C after introducing our method. A numerical comparison is also carried out against the clustering approach proposed in [13].

Paper Organization: In Section II the basics of two conventional methods for indoor localization are described. The proposed clustering approach for floor estimation is then introduced in Section III. We will also explain the essence of existing clustering algorithms and provide a brief analytical comparison between the complexity of our proposed clustering method and the existing clustering algorithms. In Section IV, we study the performance of the proposed algorithm in terms of probability of floor detection and computational complexity against the two conventional method described in Section II as well as an existing clustering approach based on real-life measurements in four different multi-storey buildings. Finally we conclude the paper in Section V.

Mathematical notations: Throughout this paper vectors and matrices are shown with the small and capital bold letters, respectively. The second norm of a vector is denoted by ‖ · ‖_2. For a set M, the cardinality of the set is shown as |M|. Equality is denoted by = and definition is denoted by ≜. For a real number a, the smallest integer number bigger than or equal to a is denoted by ⌈a⌉.

II. CONVENTIONAL APPROACHES FOR INDOOR LOCALIZATION

In this section, we shortly describe two conventional methods for indoor localization: the Nearest Neighbor (NN) fingerprinting localization which is a high-complexity but very promising method, and Weighted Centroid Localization (WCL) which is a low-complexity method but with a performance noticeably inferior to fingerprinting approach.

A. Fingerprinting Localization and Problem Statement

Consider a localization system equipped with N_{ap} positioning signals (e.g., RSS values received from APs). During the offline phase, the positioning signals are collected in N_{ap} × 1 measurements vectors m_n ≜ [m_{n,1}, m_{n,2}, . . . , m_{n,Nap} ]^T , n = 1, . . . , N_{f p}, where N_{f p} is the number of fingerprints collected in the building and m_{n,ap} is the RSS received from access point ap at n-th collected fingerprint. The corresponding known 3-D location of m_n is denoted by c_n ≜ [x_n, y_n, z_n]^T , n = 1, . . . , N_{f p}. In fingerprinting approach, the fingerprints {m_n, c_n}, n = 1, . . . , N_{f p} are stored and used for localization purposes.

Assume that an MS observes a positioning vector m_{MS} ≜ [m_{MS,1}, m_{MS,2}, . . . , m_{MS,Nap} ]^T , where m_{MS,ap} is the RSS from ap-th AP. The basic 1-NN fingerprinting approach estimates the location of the MS as

ĉ_{MS,f p} = c_j , (1)

where j = arg n∈{1,...,N_{f p}} min d(m_{MS}, m_n), (2)

where d(·, ·) is a dissimilarity measure which is determined based on our assumption for noise. For instance if we assume that the noise which deviates the m_{MS} from m_n is i.i.d white Gaussian, then d(m_{MS}, m_n) is simply the squared Euclidean distance between m_{MS} and m_n, i.e.,

d(m_{MS}, m_n) = ‖m_{MS} − m_n‖^2. (3)

In general, fingerprint-based localization approach is a pattern matching approach [7], [18], [13], rooted in pattern recognition [10], which tries to match the pattern m_{MS} observed by MS to the examples {m_n}^{Nf p}_{n=1} collected in the training data set and chooses the location of the less dissimilar example (fingerprint) as the location of MS. In this regard, each element of measurements vector m_n is a feature of the location c_n. On the other hand, any measured signal which depends only on the measurement location (regardless of noise, shadowing and other uncertainties), can be regarded as a feature of that location and used for localization using fingerprinting scheme.

The main problem with the fingerprinting approach is the huge amount of data which must be stored by servers and transmitted to the MS to localize itself when N_{f p} is a large number. The situation becomes even more severe when the fingerprints are being collected all over the time. If we want to use fingerprinting methods for localizing the mobile device, it can only be done on the server side. Because of the limited processing capabilitiy and power supply on most of the mobile devices, they are not capable of storing and processing of that huge amount of data [27] and furthermore transmitting such amount of fingerprinting data from server to the mobile device takes a lot of time, which makes the localization by mobile devices impractical.

B. Weighted Centroid Localization (WCL)

Weighted centroid localization approach, first proposed for position estimation in wireless sensor networks [8], is a simple and low-complexity but promising localization approach. The position of the MS in the WCL approach is computed as the weighted average of the positions of APs heard by the MS. Denoting the set of all hearable APs by H and the (known) coordinates of APs by c_{ap} ≜ (x_{ap}, y_{ap}, z_{ap}), ap = 1, . . . , |H|, the WCL-based estimate of mobile station coordinates is computed as

ĉ_{MS,wc} = ∑ ap∈H wapcap ∑ ap∈H wap , (4)

where w_{ap} are weight functions. To weight shorter distances (nearer APs) more than higher distances, w_{ap} may be chosen as [8] w_{ap} = 1/(d_{ap})^g , (5)

where d_{ap} is the distance between ap-th AP and the MS, and degree g is to ensure that remote APs still impact the position estimation [8].

Since the distances d_{ap} are not readily available, and also since RSS heard from AP ap is inversely proportional to d_{ap}, the weights w_{ap} in (4) can be replaced by RSS to obtain the following RSS-based formula for WCL [17], [23], [14]

ĉ_{MS,wc} = ∑ ap∈H mMS,apcap ∑ ap∈H mMS,ap , (6)

where m_{MS,ap} is the measured RSS of AP number ap by MS.

Equation (6) can be written independently for each coordinate. For instance, for the height coordinate (which is the coordinate that matters in floor estimation task) we have

ẑ_{MS,wc} = ∑ ap∈H mMS,apzap ∑ ap∈H mMS,ap , (7)

The APs deployed in commercial and privately-owned buildings, such as shopping malls or blocks of flats, are typically owned by various owners and thus their locations are not centralized or even known in totality. In industrial and university buildings, the AP location may be known to some extent, but as seen in our measurement campaigns, such information is typically stored in incomplete or inexact form, because it is not considered important from the communication point of view. For these reasons, we assume in our work that the location of APs is estimated based on the available fingerprint data, and not known in advance. Therefore, to be able to use the WCL approach, we have to first estimate the location of APs in the training phase. To estimate them, we can again employ the WCL approach and apply it on collected fingerprinting data to estimate the AP coordinates. Let us denote the set of fingerprint measurements who hear the AP ap by T_{ap} and the RSSI heard at n-th fingerprint from ap-th AP by m_{n,ap}. Then the coordinates of the AP ap can be calculated as

ĉ_{ap} = ∑ n∈T_{ap} mn,apcn ∑ n∈T_{ap} mn,ap , (8)

From (7) it is clear that for performing the floor estimation task, the only thing that we need to store at the mobile side is N_{ap} numbers z_{ap}, ap = 1, . . . , N_{ap} which are the zcoordinates of Access Points. This makes the WCL approach a promising one from complexity point of view. However, the performance of the method is relatively poor because the model suggested by (6) is an inaccurate model.

III. K-MEANS ALGORITHM FOR FINGERPRINT CLUSTERING

In this section, we will introduce a novel algorithm for substantially reducing the size of fingerprinting data using Kmeans clustering algorithm. The proposed algorithm achieves a performance very close to the NN fingerprinting approach while decreasing the computational complexity both in terms of search time and memory size needed for storing the offline data. We first briefly describe the basic form of K-means clustering and then introduce our floorwise clustering approach. Finally we compare the complexity of the proposed method with existing fingerprinting clustering approaches.

A. K-means clustering

K-means clustering [15] is a vector quantization method for finding the CH’s in a set of unlabeled data [11]. The K-means algorithm aims to partition N K-dimensional observation vectors {x_1, . . . , x_N } into N_c ≤ N clusters by iteratively moving the CH’s {μ_k}^{Nc}_{k=1}, which are the representatives of clusters, to minimize the within cluster sum-of-squares N_c∑

k=1 ∑ x_i∈C_k ‖x_i − μ_k‖^2, (9)

with respect to {C_1, C_2, . . . , C_{Nc} }, where C_k denotes the k-th cluster. Minimizing the objective function in (9) in general is NP-hard [9]. But the K-means algorithm provides a suboptimal solution to it by alternating the following two steps in each iteration until convergence [11]:

1) for each CH, identify the subset of data points which are closer to it than any other CH; and 2) compute the mean of all data points belonging to each CH and take it as the new CH.

The above-mentioned K-means iterations guarantee the convergence to a stationary point of (9) [20].

B. Fingerprint clustering for floor detection

When the goal of localization is to detect the floor, for example in a multistorey building, the clustering can be applied by clustering the fingerprints collected in each floor separately. The number of clusters can be different from one floor to another.

We want to cluster the fingerprints in a building with F floors with the ultimate goal to use the CH’s for floor detection. Assume that the set of all fingerprints is partitioned as F = F_1∪. . .∪F_F , where F_f denotes the set of fingerprints collected in floor f. The floorwise fingerprint clustering then can be accomplished by applying K-means clustering algorithm to vectors m_n ∈ F_f for each f, separately. In the detection phase, the CH’s in all floors are compared to the MS observation vector m_{MS} and the floor of the most similar cluster head is chosen as our estimate of the floor. Mathematically, denoting the set of the CH’s in f-th floor by {m̃_{f,1}, . . . , m̃_{f,Nc,f} } where N_{c,f} is the number of clusters in the f-th floor, we have

f̂ = arg f ∈{1,...,F } min_{f,k} d(m_{MS}, m̃_{f,k}). (10)

This method is in general referred to as K-means classification [11, Chapter 13] in the literature.

C. Comparison to the existing algorithms

To further elaborate the the novelty of the proposed algorithm, here we compare it with the existing fingerprint clustering algorithms based on the formulation given above.

We denote the set of all fingerprint measurements M ≜ {m_1, . . . , m_{Nf p} } and the set of the corresponding fingerprint coordinates by C ≜ {c_1, . . . , c_{Nf p} }. Furthermore, we denote the set of resulting cluster heads by M̃ ≜ {m̃_1, . . . , m̃_{Nc} } and the set of measurement vectors in c-th cluster by M_c, c = 1, . . . , N_c. Clearly we have M = ∪^{Nc}_{c=1}M_c. The existing fingerprinting clustering methods all include the following three steps:

S1 First we find the most similar element of the set M̃ to m_{MS}. Denote this element by m̃_ĉ.

S2 Then we find the most similar element of the set M_ĉ to m_{MS}. Denote this element by m_ĵ. Notice that m_ĵ ∈ M.

S3 Finally, our estimate for the coordinate of MS is c_ĵ ∈ C. The main problem of these methods, which has been solved in our proposed algorithm, is that in order to carry out step S2, we have to save all the fingerprints. The only advantage of these clustering algorithms over the ordinary fingerprint matching methods is that after finding the most matched cluster head, the search is limited within only that cluster instead of the whole data base. But since it is not known in advance what cluster will be chosen later in step S1, these methods still need to save all of the cluster sets M_c, c = 1, . . . , N_c (whose union is equal to the whole fingerprinting database), the zcoordinates of all fingerprints, and the set of the cluster heads M̃, which altogether are of size (N_{ap} + 1)N_{f p} + N_{ap}N_c.

In our method, on the other hand, we do not need to save M and C. We are able to estimate the floor only from the cluster heads and their corresponding floor labels which is only of size (N_{ap} + 1)N_c. In Section IV we will provide a numerical comparison of our method against one of the existing clustering approaches as well as the two conventional floor estimation methods explained in Section II.

IV. MEASUREMENT RESULTS AND ANALYSIS

In this section, we study the performance of the proposed clustering algorithm by selected real-life measurement examples.

A. Measurement set-up

The numerical examples here are based on real-life WLAN data collected in four multi-storey buildings. The first building is a four-floor university building (Univ-1), the second building is a three-floor university building (Univ-2), the third building is a six-floor shopping mall (Mall), and finally the fourth building is a four-floor office building (Office).

We have two sets of data for each building. The first data set includes the fingerprints collected in the building which is used for training. This is the data set to which the fingerprint clustering is applied and afterwards we only use the CH’s for floor detection purposes. We refer to this data set as fingerprinting data. The second set has been collected along several different tracks in each building, where each track includes tens to hundreds of data points. This data set will be used for examining the performance of the proposed algorithm and is referred to as test data.

The measurement points for collecting fingerprinting data and test data in Univ-1 and Univ-2, are illustrated in Figures 1 and 2, respectively. Figure 3 shows the power map of a selected AP, namely AP number 4, in the first floor of Univ-1. This is also the floor where AP 4 is situated. The red points have the highest RSS values which are in fact points closest to the physical location of the AP and the blue points have the lowest RSS values and are the points farthest from the AP.

A summary of relevant technical details in each building including the number of floors N_{f l}, the size of fingerprinting data determined by N_{f p}, the size of test data determined by the number of test points N_t, and the number of Access Points N_{ap} heard are shown in Table I.

B. Numerical study of four methods for floor estimation

As mentioned in Section III-B, we apply the K-means clustering algorithms to the fingerprints in each floor separately. This task can be done on the server side when the computational resources are powerful enough to apply the clustering algorithm to a possibly huge amount of fingerprinting data. The server then sends the computed cluster heads together with the floor label of each cluster head to the mobile device to be used for positioning in the online phase. In other words, the data needed in the mobile side for performing the floor detection task is only limited to the cluster heads and their corresponding floor labels. We remark that if we want to use the ordinary fingerprinting method, the server would need to send the entire fingerprinting data to the mobile device. Therefore by using the clustering algorithm, we will achieve a considerable reduction in the size of data needed to be transmitted to the mobile device

Fig. 1. Measurement points for collecting fingerprinting data and test data in Univ-1.

Fig. 2. Measurement points for collecting fingerprinting data and test data in Univ-2.

TABLE I. NUMBER OF FLOORS N_{f l} , NUMBER OF TRAINING SAMPLES (FINGERPRINTING DATA) N_{f p}, NUMBER OF TEST SAMPLES N_t , AND

NUMBER OF ACCESS POINTS Nap IN EACH OF THE FOUR BUILDINGS.

Building N_{f l} N_{f p} N_t N_{ap} Univ-1 4 16080 6796 509 Univ-2 3 9923 2301 489 Mall 6 1633 3503 468 Office 4 354 3873 1103

for floor detection. The size reduction provides two benefits in the mobile side: first, the memory size required for storing the data (cluster heads) is less than the ordinary fingerprinting, and second, the complexity of the search for finding the most similar cluster head decreases significantly.

Tables II, III, and IV show, respectively, the probability of floor detection, the time for floor estimation in online phase^1, and the size of data needed on the mobile device for four differ-

1The time is the running time of floor detection algorithm on a computer with 2.2 GHz Intel Core i7 CPU and 16 GB of random access memory (RAM).

Fig. 3. Power map (the map of RSS values) of the first floor of Univ-1 for AP number 4. The figure shows how the received signal strength (RSS) from AP number 4 is distributed over the floor.

ent methods: ordinary 1-Nearest Neighbor (1-NN) fingerprint positioning, the Weighted centroid localization (WCL) method, the clustering approach proposed in [13], and our proposed floorwise clustering algorithm. For the method proposed in [13] and also for our approach, the clustering is implemented for three different clustering ratios ρ ∈ {0.01, 0.05, 0.1}, where the clustering ratio here has the following relationship with the number of cluster heads in f-th floor, N_{ch,f} , and the total number of fingerprints in f-th floor, N_{fp,f} :

N_{ch,f} = ⌈ρ × N_{fp,f} ⌉. (11)

As it can be seen from Table II, even with the very small clustering ratio of ρ = 0.01, the performance of the proposed floorwise clustering approach is very close to the 1- NN fingerprinting approach for the first two buildings. The performance for the next two buildings, namely Mall and Office, however degrades which is mainly because of relatively small number of fingerprints collected in these two buildings (see table I). The performance is clearly superior to the WCL approach. The performance of [13] is similar to the 1-NN fingerprinting approach except for the first building (which has the highest number of fingerprints) where its performance degrades significantly. This is because when the number of fingerprints is very large, it is more likely that the method in [13] puts the fingerprints from different floors to the same cluster which may eventually results in an erroneous estimate for the floor.

For higher values of ρ on the other hand, the performance of our proposed method becomes very similar to 1-NN fingerprinting. For some points it even slightly outperforms the 1- NN fingerprinting which is because like any other compression algorithm the clustering approach provides some denoising too.

From Table III we can see that the time needed for computing the estimated floor using our proposed clustering approaches is much faster than that of ordinary fingerprinting approach. It can be seen that the proposed method is also faster than the clustering approach of [13] and is only inferior to WCL which has a rather poor floor estimation performance.

From Table IV, it can be seen that the size of data needed at the mobile side for our method is noticeably smaller than those

TABLE II. PROBABILITY OF FLOOR DETECTION FOR EACH METHOD.

Building 1-NN WCL [13] Proposed Floorwise Clustering ρ = 0.01 ρ = 0.05 ρ = 0.1 ρ = 0.01 ρ = 0.05 ρ = 0.1 Univ-1 0.8868 0.7016 0.7076 0.7088 0.7056 0.8973 0.8996 0.9036 Univ-2 0.9944 0.6784 0.9831 0.9904 0.9904 0.9739 0.9930 0.9870 Mall 0.9255 0.6041 0.8927 0.9146 0.9212 0.8401 0.9055 0.9366 Office 0.8084 0.7033 0.8012 0.7896 0.8066 0.7088 0.7981 0.8043

TABLE III. ELAPSED TIME (IN SECONDS) FOR FLOOR ESTIMATION USING EACH METHOD.

Building 1-NN WCL [13] Proposed Floorwise Clustering ρ = 0.01 ρ = 0.05 ρ = 0.1 ρ = 0.01 ρ = 0.05 ρ = 0.1 Univ-1 32.62 0.066 0.67 1.229 2.769 0.35 1.25 3.92 Univ-2 5.935 0.026 0.228 0.284 0.511 0.095 0.258 0.772 Mall 0.832 0.031 0.171 0.155 0.195 0.069 0.100 0.180 Office 0.366 0.035 0.218 0.160 0.162 0.084 0..095 0.137

TABLE IV. THE SIZE OF DATA (IN KILO BYTES) NEEDED AT THE MOBILE END FOR PERFORMING THE FLOOR DETECTION TASK.

Building 1-NN WCL [13] Proposed Floorwise Clustering ρ = 0.01 ρ = 0.05 ρ = 0.1 ρ = 0.01 ρ = 0.05 ρ = 0.1 Univ-1 864 0.412 942 1100 1300 78 319 692 Univ-2 553 0.389 602 709 811 53 203 451 Mall 315 0.534 332 356 381 20 61 123 Office 262 0.663 274 295 315 20 53 106

of 1-NN fingerprinting approach and the clustering approach of [13], especially for small clustering ratios. The method of [13] needs the highest memory size that as explained in Section III-C, is because it has to store the cluster heads in addition to all fingerprints.

Finally, Figure 4 illustrates an overall comparison between the four mentioned methods based on the three performance metrics of i) the elapsed time for computing the floor estimation, ii) the data size needed in the mobile side, and iii) the probability of floor detection. The clustering ratio for the clustering method of [13] and our proposed clustering method is ρ = 0.01. The colors are to distinguish between the methods and the four vertices of each pyramid are corresponding to the four buildings under study in the experiment. As it can be seen the proposed method (red pyramid) is much closer to the origin of the horizontal plane than [13] (blue pyramid) and 1-NN (cyan pyramid) which means it has a much lower complexity than them. It is not as close as the WCL (magenta pyramid), but instead it delivers a much better floor detection probability than WCL. Thus, overall, the proposed method provides excellent floor detection performance while being able to reduce the computing and data transfer complexities in a substantial manner.

V. CONCLUSION

With the goal of substantially reducing the size of fingerprinting data needed for storage and transmission in floor estimation, a method for clustering fingerprints using K-means algorithm was proposed. The proposed technique applies the clustering algorithm floorwise and keeps and transmits only the cluster heads together with their corresponding floor labels for floor estimation. The performance of the proposed methods was evaluated with comprehensive real-life indoor measurements. The obtained results show that while the proposed method delivers a significant enhancement in the speed of floor estimation algorithm and a substantial reduction in the size of fingerprint database needed at the mobile device, its localiza-

Fig. 4. Comparison between the four methods based on the 3 performance metrics, namely elapsed time, data size, and floor detection probability. The clustering ratio for [13] and our proposed method is ρ = 0.01.

tion performance is in par with the conventional fingerprinting approach which uses all the data for accomplishing localization task.

REFERENCES

[1] K. Maneerat and C. Prommak, “An Enhanced Floor Estimation Algorithm for Indoor Wireless localization systems using confidence interval approach”, In International Journal of Computer, Control, Quantum and Information Engineering Vol:8, No:7, 2014 [2] S. Gansemer, U. Grossmann, and S. Hakobyan, “RSSI-based euclidean distance algorithm for indoor positioning adapted for the use in dynamically changing WLAN environments and multi-level buildings”, In 2010 Int. Conf. Indoor Positioning and Indoor Navigation, pp. 16.

[3] H. H. Liu; Y. N. Yang, “WiFi-based indoor positioning for multi-floor Environment,” TENCON 2011 - 2011 IEEE Region 10 Conference, pp.597,601, 21-24 Nov. 2011 doi: 10.1109/TENCON.2011.6129175 [4] E.S. Lohan, J. Talvitie, P. Figueiredo e Silva, H. Nurminen, S. Ali- Löytty, R. Piché, “Received signal strength models for WLAN and

BLE-based indoor positioning in multi-floor buildings”, In Proc. of IEEE ICL GNSS, Sweden, Jun 2015 [5] A. Liu, T. Robison, “Cost and accuracy: factors concerning various indoor location estimation methods”, 2004, https://courses.cs.washington.edu/courses/ cse561/04au/projects/papers/A.Liu-Robison.pdf, (accessed Jun 2015) [6] N. K. Sharma, “A weighted center of mass based trilateration approach for locating wireless devices in indoor environment”, In Proceedings of the 4th ACM international workshop on Mobility management and wireless access (MobiWac ’06), New York, NY, USA, pp. 112-115, 2006 [7] P. Bahl and V. N. Padmanabhan. “Radar: An in-building RF-based user location and tracking system”, In INFOCOM 2000. Nineteenth Annual Joint Conference of the IEEE Computer and Communications Societies. Proceedings. IEEE, volume 2, pages 775–784, 2000.

[8] J. Blumenthal, R. Grossmann, F. Golatowski, and D. Timmermann.

“Weighted centroid localization in zigbee-based sensor networks”. In Intelligent Signal Processing, 2007. WISP 2007. IEEE International Symposium on, pages 1–6. IEEE, 2007.

[9] S. Dasgupta and Y. Freund. “Random projection trees for vector quantization”. Information Theory, IEEE Transactions on, 55(7):3229– 3242, July 2009.

[10] R. O. Duda, P. E. Hart, et al. Pattern classification and scene analysis, volume 3. Wiley New York, 1973.

[11] T. Hastie, R. Tibshirani, and J. Friedman. The elements of statistical learning, volume 2. Springer.

[12] V. Honkavirta, T. Perala, S. Ali-Löytty, and R. Piché. “A comparative survey of WLAN location fingerprinting methods.” In Positioning, Navigation and Communication, 2009. WPNC 2009. 6th Workshop on, pages 243–251. IEEE, 2009.

[13] S. P. Kuo, B. J. Wu, W. C. Peng, and Y. C. Tseng. “Cluster-enhanced techniques for pattern-matching localization systems”. In Mobile Adhoc and Sensor Systems, 2007. MASS 2007. IEEE Internatonal Conference on, pages 1–9. IEEE, 2007.

[14] Y. Liu, X. Yi, and Y. He. “A novel centroid localization for wireless sensor networks,” International Journal of Distributed Sensor Networks, 2012.

[15] J. MacQueen et al. “Some methods for classification and analysis of multivariate observations.” In Proceedings of the fifth Berkeley symposium on mathematical statistics and probability, volume 1, page 14. California, USA, 1967.

[16] Y. Mo, Z. Cao, and B. Wang. “Occurrence-based fingerprint clustering for fast pattern-matching location determination”. Communications Letters, IEEE, 16(12), 2012.

[17] J. Murray and B. Tarlow. Wi-Fi position fix. Europan patent application EP 2574954A1, 2013.

[18] T. Roos, P. Myllymäki, H. Tirri, P. Misikangas, and J. Sievänen. “A probabilistic approach to WLAN user location estimation.” International Journal of Wireless Information Networks, 9(3):155–164, 2002.

[19] F. Seco, A. R. Jiménez, C. Prieto, J. Roa, and K. Koutsou. “A survey of mathematical methods for indoor localization.”

[20] S. Z. Selim and M. A. Ismail. “K-means-type algorithms: a generalized convergence theorem and characterization of local optimality.” Pattern Analysis and Machine Intelligence, IEEE Transactions on, (1):81–87, 1984.

[21] S. Shrestha, J. Talvitie, and E. S. Lohan. “On the fingerprints dynamics in WLAN indoor localization.” In ITS Telecommunications (ITST), 2013 13th International Conference on, pages 122–126. IEEE, 2013.

[22] N. Swangmuang and P. Krishnamurthy. “On clustering rss fingerprints for improving scalability of performance prediction of indoor positioning systems.” In Proceedings of the first ACM international workshop on Mobile entity localization and tracking in GPS-less environments, pages 61–66. ACM, 2008.

[23] J. Wang, P. Urriza, Y. Han, and D. Cabric. “Weighted centroid localization algorithm: theoretical analysis and distributed implementation.” Wireless Communications, IEEE Transactions on, 10(10):3403–3413, 2011.

[24] T. Wigren. “Adaptive enhanced cell-ID fingerprinting localization by clustering of precise position measurements.” Vehicular Technology, IEEE Transactions on, 56(5):3199–3209, 2007.

[25] M. A. Youssef, A. Agrawala, and A. U. Shankar. “WLAN location determination via clustering and probability distributions.” In Pervasive Computing and Communications, 2003.(PerCom 2003). Proceedings of the First IEEE International Conference on, pages 143–150. IEEE, 2003.

[26] N. Zhang and J. Feng. “Polaris : A fingerprint-based localization system over wireless networks.” Book Chapter, Lecture Notes in Computer Science, Springer, 2012.

[27] H. Liu, H. Darabi, and P. Banerjee, “Survey of wireless indoor positioning techniques and systems,” Systems, Man, and Cybernetics, Part C: Applications and Reviews, IEEE Transactions on, 37(6): 1067- 1080, Nov. 2007.