arXiv:2304.06490v1 [eess.SP] 25 Mar 2023

A New Paradigm for Device-free Indoor Localization: Deep Learning with Error Vector Spectrum in Wi-Fi Systems

Wen Liu, An-Hung Hsiao, Li-Hsiang Shen and Kai-Ten Feng Department of Electronics and Electrical Engineering, National Yang Ming Chiao Tung University, Hsinchu, Taiwan Email: swimmingliu880208.ee10@nycu.edu.tw, e.c@nycu.edu.tw, gp3xu4vu6.cm04g@nctu.edu.tw, and ktfeng@nycu.edu.tw

Abstract—The demand for device-free indoor localization using commercial Wi-Fi devices has rapidly increased in various fields due to its convenience and versatile applications. However, random frequency offset (RFO) in wireless channels poses challenges to the accuracy of indoor localization when using fluctuating channel state information (CSI). To mitigate the RFO problem, an error vector spectrum (EVS) is conceived thanks to its higher resolution of signal and robustness to RFO. To address these challenges, this paper proposed a novel error vector assisted learning (EVAL) for device-free indoor localization. The proposed EVAL scheme employs deep neural networks to classify the location of a person in the indoor environment by extracting ample channel features from the physical layer signals. We conducted realistic experiments based on OpenWiFi project to extract both EVS and CSI to examine the performance of different device-free localization techniques. Experimental results show that our proposed EVAL scheme outperforms conventional machine learning methods and benchmarks utilizing either CSI amplitude or phase information. Compared to most existing CSI-based localization schemes, a new paradigm with higher positioning accuracy by adopting EVS is revealed by our proposed EVAL system.

I. INTRODUCTION

Smart home appliances have sprung up one after another in this era of the rise of the Internet of Things (IoT). Device-free indoor localization has emerged as a crucial research topic in recent years, given its potential to revolutionize how we interact with indoor environments. An accurate indoor location system enables a variety of location-based services, including intrusion detection, intelligent building management, and targeted advertising. Nowadays, camera-based detection [1] and infrared sensors [2] are the most common techniques for device-free indoor localization. However, these methods have several limitations that restrict their practical application. Camera-based detection, for example, raises concerns regarding personal privacy and is susceptible to blind spot problems. These limitations have led to increased interest in alternative methods for device-free indoor localization. Furthermore, infrared sensor-based schemes are only applicable when the individual is within the line-of-sight (LoS), making them ineffective when the person is stationary or in a non-line-of-sight (NLoS) area. To address this challenge, researchers have explored alternative technologies that utilize wireless signals to estimate the position of humans indoors [3].

The received signal strength indicator (RSSI) is a popular and straightforward approach for indoor localization, as indicated in [4] and [5]. This technique estimates the distance between a transmitter and a receiver by analyzing the strength of the received signal. By measuring the RSSI of wireless signals emitted by Wi- Fi access points, Bluetooth beacons, or other wireless devices, it is possible to obtain the location of individuals in indoor environments. On the other hand, time-of-flight (ToF) technology can also be utilized for device-free indoor localization by measuring the time it takes for a signal to travel from a transmitter to a receiver. [6] investigates the time difference of arrival, and [7] exploits two-way ToF to calculate the range measurements. However, either the RSSI-based or ToF-based localization method is prone to signal attenuation, where the accuracy decreases with increasing distance between the access points (APs) or beacons. Additionally, they are susceptible to multipath interference and environmental variations, which can significantly affect the accuracy of the method. Moreover, RSSI needs to achieve highprecision measurement by deploying multiple APs or beacons, and the receiver required for ToF is quite expensive.

In order to solve the estimation error from multipath effect and signal attenuation, channel state information (CSI) is an advanced approach for indoor localization that utilizes the subtle changes in the wireless signal to estimate the position of the target, which is divided into amplitude and phase information. In [8]–[10], they adopt learning-based methods with CSI amplitude as input to classify the position of a human. In [11], [12], they adopt deep learning based methods leveraging CSI information to detect human presence in indoor environments. However, the CSI amplitude signal characteristics become unresponsive when the person is in NLoS positions, which is pointed out in [13]. In contrast, the CSI phase information is susceptible to the indoor environment, which is capable of detecting slight fluctuation due to reflecting signals. Therefore, papers of [14], [15] have utilized CSI phase information as a characteristic signal to the traditional machine learning algorithm. Nonetheless, the raw CSI phase information substantially suffers from the random frequency offset (RFO) problem, which leads to indescribability. This requires specialized hardware as well as sophisticated signalprocessing algorithms, limiting its practical applicability.

For the above-mentioned reasons, we have alternatively employed a unique feature of wireless signals, i.e., error vector spectrum (EVS) to accurately estimate the position of humans in indoor environments. EVS is capable of surmounting the low localization resolution in NLoS to break through the such predicament. We achieve this by analyzing the error vector of the received wireless signals, which enables us to identify the exact location of the target. Moreover, due to several emerging advanced sensing specifications and techniques applied in wireless local area networks (WLANs) for IEEE 802.11ax/be/bf [16]– [18] and even to-be-discussed next-generation Wi-Fi 8 [19], where most of them are restricted by certain hardware limitations, which provokes a difficulty of development. Therefore, we require open equipment, e.g., OpenWiFi [20] to develop advanced sensing and localization schemes without laborious switching platforms.

Fig. 1: System architecture for indoor localization by deploying commercial Wi-Fi devices.

The main contributions of this paper are listed as follows. • Best to our knowledge, we are the first work to propose an error vector assisted learning (EVAL) using OpenWiFi system to improve the accuracy of device-free indoor localization, in which the data preprocessing and error vector based classifier are presented to utilize deep neural network learning. Our proposed method outperforms existing approaches in terms of accuracy.

• To overcome the limitations of CSI caused by the RFO issue, our proposed system designs are based on the employment of EVS as a potential feature extracted from the physical layer signal. EVS carries diversified information, which can provide a more accurate estimation of the indoor location compared to conventional CSI-based methods.

• Experiment trials are conducted by establishing an OpenWiFi-based platform, which is compatible with existing WLAN systems. We have demonstrated the advantages and effectiveness of the proposed EVAL system for indoor localization. The results have demonstrated that EVAL outperforms other learning algorithms and mechanisms utilizing CSI information, which achieves the highest accuracy in device-free localization.

II. SYSTEM ARCHITECTURE Fig. 1 illustrates the system architecture of our proposed approach for indoor localization in a single-room environment. We set up commercial off-the-shelf Wi-Fi APs as the transmitter and an open-source software-defined radio (SDR) implementation of a Wi-Fi AP as the receiver. The Wi-Fi signal packets are broadcast from the transmitter and collected by the receiver. We employ the orthogonal frequency division multiplexing (OFDM) technique in IEEE 802.11ax/be [16], [17] for acquiring diversified channel characteristics in the indoor environment. These OFDMpartitioned subcarriers are orthogonal to each other within a channel, ensuring that they cause no interference to each other. The received signal can be expressed as

Y = HX + W , (1)

where Y and X represent the received and transmitted complex signal matrices of dimension K × N, respectively, whilst W accounts for additive white Gaussian noise (AWGN) with dimension K × N. Here, K and N are the maximum numbers of subcarriers and symbols, respectively. H is the complex channel response diagonal matrix of dimension K ×K and can be further represented as

H = diag (h_1, h_2, ..., h_k, ..., h_K ) , (2)

Fig. 2: Schematic diagram of the proposed EVAL system.

where k ∈ [1, ..., K] indicates the subcarrier index. Each element of H, which is h_k, is generally described by the channel impulse response (CIR) to the multipath effect of the channel, which also characterizes the multipath propagation attenuated, scattered, and faded in respective subcarriers. Thus, each element of H on the diagonal is modeled as

h_k = M∑ m=1 α_{m,k}e^{−j2π dmλ}k = |h_k|e^{j(∠hk )}, (3) where M is the total number of propagation multipath received at the receiver end. λ represents the wavelength, α_{m,k} stands for complex signal attenuation on the m^{th} path at k^{th} subcarrier, and d_m refers to the propagation length on the m^{th} path. Joint factors of α_{m,k} and d_m reflecting channel variation can be obtained from the amplitude |h_k| and phase ∠h_k of the k^{th} subcarrier. As depicted in Fig. 1, the received signal is then processed to extract the in-phase and quadrature (I/Q) signal information, where the I/Q signal after equalization is displayed as the constellation diagram. The data preprocessing block transforms I/Q signals into EVS ε expressed as ε = [ε_1, ε_2, ..., ε_k, ..., ε_K ] . (4) Each element of ε can be expressed as the amplitude and phase combination form ε_k = |ε_k|e^{j(∠εk )}, (5) where |ε_k| and ∠ε_k represent the amplitude and phase information of EVS and can be utilized as the localization features, respectively.

III. PROPOSED ERROR VECTOR ASSISTED LEARNING (EVAL) SYSTEM The EVAL system for indoor localization consists of offline and online stages, as shown in Fig. 2. In the offline stage, the received I/Q signal undergoes data preprocessing and is transformed into EVS. Feature extraction is performed using a deep neural network (DNN) with the EVS as input. The weights and biases are obtained by training the error vector based classifier with the help of a loss function and the backpropagation mechanism. During

Fig. 3: The OFDM frame structure in IEEE 802.11 series.

online session, the received I/Q signal is preprocessed in the same manner as in the offline section and then transformed into EVS. The EVS is then fed into the well-trained DNN model, and the real-time localization results can be obtained. Detailed information about EVAL is elaborated as follows.

A. Data Sampling and Disintegration

To extract meaningful information from I/Q signals, we have to first detect packets and symbols. The frame structure of OFDM in 802.11ax/be, depicted in Fig. 3, is composed of a preamble and a payload frame. The preamble consists of the short training field (STF), long training field (LTF), and signal field (SF), while the payload frame contains only the data field (DF). Therefore, to convert the received I/Q signal from a bit stream to a packet form and decompose it into a frame, packet, and symbol detection are required. Thus, the received matrix can be expressed as

Y = [Y_S , Y_L, Y_G, Y_D] , (6)

where Y_S , Y_L, Y_G, and Y_D are STF, LTF, SF, and DF matrix, with the respective dimension of K × N_S , K × N_L, K × N_G, and K × N_D. However, the STF Y_S only utilizes only onefourth of the total subcarriers, resulting in low channel resolution. On the other hand, the SF Y_G is used to describe the basic information of the packet, such as MCS and length of the packet, but it always uses binary phase-shift keying (BPSK) modulation. Therefore, we apply LTF Y_L and DF Y_D for the following data preprocessing procedure. As for the sampling in an actual receiver, the received signal is down-converted to the baseband by a local oscillator of the receiver with local carrier frequency, which leads to phase rotation due to carrier frequency mismatch between the AP transmitter and receiver. Given the effect of frequency offset and (1), the received signal after down-converted sampling and symbol detection can be obtained as y_{Lk,n} = e^{−jϕn} h_kx_{Lk,n} + w_{k,n}, ∀n = 1, 2, ..., N_L, (7) y_{Dk,n} = e^{−jϕn} h_kx_{Dk,n} + w_{k,n}, ∀n = 1, 2, ..., N_D, (8) where x_{Lk,n} , y_{Lk,n} , x_{Dk,n} , and y_{Dk,n} correspond to the transmit and receive LTF and DF I/Q symbols at the k^{th} subcarrier and n^{th} symbol. Noted that the term e^{−ϕn} represents the RFO on the n^{th} symbol and this term is identical among all subcarriers of each OFDM symbol.

B. Channel and Frequency Offset Estimation

The LTF symbol is used for fine-grained timing synchronization and channel estimation, in which the estimated channel response can be modeled as ĥ = [ĥ_1, ĥ_2, ..., ĥ_k, ..., ĥ_K ], (9) where ĥ is known as CSI vector. The AP transmits N_L of the same LTF symbols with BPSK to estimate the channel. In other words, the transmitted LTF x_{Lk,n} is known. Thus, we can conduct a generic sample average for channel estimation for each element in ĥ by

ĥ_k = 1 N_L N_L∑

n=1 y_{Lk,n} x_{Lk,n} . (10) According to (7), we can rewrite (10) as

ĥ_k = 1 N_L N_L∑

n=1 ( e^{−jϕn} h_kx_{Lk,n} + w_{k,n} ) x_{Lk,n}

= 1 N_L N_L∑

n=1 ( e^{−jϕn} h_k + w_{k,n}x_{Lk,n} ) , (11)

where x_{Lk,n} can be removed in the first equation due to LTS being transmitted under BPSK and x_{Lk,n} ∈ [−1, 1]. Substituting (3) into (11) yields

ĥ_k = 1 N_L N_L∑

n=1 M∑ m=1 ( α_{m,k}e^{−j} ( 2π^{dm}_{λk} +ϕ_n ) + w_{k,n}x_{Lk,n} ) . (12)

Since LTF is with a short time of length 8 μsec in the specification, we can ignore the difference between each LTF symbol and AWGN w_{k,n}. Eventually, (12) can be simplified as ĥ_k ≈ e^{−jϕ}n^M ∑ m=1 α_{m,k}e^{−j2π dmλ}k = | | |ĥk | | | e^{j(∠ĥk )}. (13) So far, we have derived the formula of CSI completely and rigorously. Note that the RFO term ϕ_n can cause fortuitous changes in the CSI phase information ∠ĥ, making it unpredictable. To solve the RFO problem, the payload frame is inserted with the pilot subcarrier which is shown in Fig. 3. The pilot subcarrier is used to track the phase variations and remove the RFO of the corresponding DF symbol. After extracting the pilot subcarriers from each symbol of DF, we define the estimated RFO matrix Φ̂ with a dimension of N_D × N_D, which is a diagonal matrix as

Φ̂ = diag ( ϕ̂_1, ϕ̂_2, ..., ϕ̂_n, ..., ϕ̂_{ND} ) (14)

with each element obtained as [21] Φ̂_{nn} = ϕ̂_n = ∠ (∑ ψ∈Ψ y_{Dψ,n}ĥ_ψ ) where ψ refers to the subcarrier index of the pilot subcarrier. Ψ is the pilot subcarrier set, which is fixed for each OFDM symbol under the 802.11a WLAN standard. Therefore, we can obtain the estimated RFO matrix Φ̂ using the CSI ĥ and the received pilot subcarrier y_{Dψ,n} .

C. Equalization

We implement a zero-forcing (ZF) equalizer to eliminate the channel response in the received DF matrix Y_D with the aid of CSI ĥ. We also apply the estimated RFO matrix Φ̂ to eradicate phase rotation. We can then obtain the equalized symbol matrix X̄_D with dimension of K × N_D as

X̄_D = QY_De^{−jΦ̂}, (15)

(a) (b)

(c) (d)

Fig. 4: The spectrum variation of OFDM symbol in time diagram for a stationary person at (a) location i and (b) location j. The schematic diagrams of the EVS are respectively shown at (c) location i and (d) location j.

where Q represents the ZF equalizer diagonal matrix with the dimension K × K. Each diagonal element of Q is the reciprocal of ĥ, which can be expressed as

Q_{kk} = q_k = ĥ^{−1}_k . (16)

Based on (8) and (16), we can formulate each element of X̄_D as x̄_{Dk,n} = e^{−jϕ̂n} q_ky_{Dk,n} = e^{−jϕ̂n}ĥ^{−1}_k (e^{−jϕn} h_kx_{Dk,n} + w_{k,n}). (17)

By employing the ZF equalizer and estimated RFO matrix, we have successfully obtained the equalized symbol matrix.

D. Error Vector Spectrum Modeling

In Fig. 4, the spectrum variation of OFDM symbols is shown for two cases, i.e., when a human remains stationary at locations i and j. The corresponding cases are depicted in Figs. 4(a) and 4(b), respectively. The x-axis, y-axis, and z-axis represent the frequency, time, and degree of channel distortion, respectively. As can be seen in the figure, the same subcarrier experiences similar channel attenuation when propagating at the same frequency under the same case. Additionally, different cases can be distinguished from each other due to the channel environment diversity caused by human blocking in different locations. Based on this feature, we can recover the distortion of each subcarrier and obtain the channel characteristics. Figs. 4(c) and 4(d) show schematic diagrams corresponding to the above cases. We define the Euclidean distance and phase rotation degree between the equalized and reference symbols as the amplitude and phase of the EVS, respectively. However, each symbol may be transmitted from a different constellation point after modulation. Therefore, we need to utilize modulation classification and hard-decision decoding to obtain the reference symbol corresponding to the received symbol. 802.11 series WLAN adopts four types of modulation schemes: BPSK, quadrature phase-shift keying (QPSK), 16-quadrature amplitude modulation (16-QAM), and 64-QAM. To classify the modulation methods for each equalized symbol matrix X̄_D, we deploy a k-means clustering algorithm [22].

Therefore, the modulation scheme m_S can be classified by the transfer function f_K (·) as

m_S = f_K (X̄_D), (18)

where m_S ∈ {2, 4, 16, 64} is the modulation order determined by clustering transfer function f_K , where C^{K×ND} → N^{1×1} . According to the adopted modulation, we employ hard-decision decoding to recover the equalized symbol to the reference symbol with the decoding transfer function f_D(·) as X̂_D = f_D(X̄_D, m_S ), (19)

where X̂_D is the estimated reference symbol matrix with dimension of K × N_D. Furthermore, both X̂_D and X̄_D are complex with dimension of C^{K×ND} . To eliminate the redundant estimated RFO term from (17), the raw EVS E_R with dimension K × N_D can be derived as

E_R = X̄_D − e^{−jΦ̂}X̂_D. (20)

According to (13), (14), and (17), each element of E_R is derived as ε_{Rk,n} = e^{−jϕ̂n}ĥ^{−1}_k (e^{−jϕn} h_kx_{Dk,n} + w_{k,n}) − e^{−jϕ̂n}x̂_{Dk,n} = e^{−jϕ̂n}ĥ^{−1}_k w_{k,n}. (21) Once the reference symbol x_{Dk,n} has been eliminated by the estimated reference symbol x̂_{Dk,n} , we can proceed to derive the signal based on equation (11) as ε_{Rk,n} = e^{−jϕ̂n} ( e^{−jϕn} M∑ m=1 α_{m,k}e^{−j2π dmλ}k )_{−1} w_{k,n}

= (_M ∑ m=1 α_{m,k}e^{−j2π dmλ}k )_{−1} w_{k,n}. (22) The above equation demonstrates that the error vector can eliminate the RFO ϕ_n, making the EVS phase information more stable and reliable compared to the CSI phase information when used for indoor localization. To transform the raw EVS matrix into vector form, we take the mean of the symbols, which is a similar processing method to the sample average method used for CSI. Accordingly, the raw EVS can be expressed as ε̄_R = [ε̄_{R1} , ε̄_{R2} , ..., ε̄_{Rk} , ..., ε̄_{RK} ], (23) where ε̄_{Rk} =^1_{ND} ∑_{ND} n=1 ε_{Rk,n} . Generally, the N_D is larger than N_L, implying that there exist more symbols available for estimating EVS than CSI. As a result, the EVS has the potential to accomplish more accurate channel estimation than that of CSI. To elaborate further, the noise term w_{k,n} dominates (22), making the raw EVS difficult to interpret. To address this issue, we have defined a calibration method to reduce the noise effect in the raw EVS, which is formulated as

ε_k = ε̄_{Rk} 2^γ + 2^γ − 1

2^γ · ( 1 T T∑ t=1 ε̄_{Rk} (t) ) , (24)

where T is the number of packets and γ is the calibration parameter. Note that the second term dominates with the increment of γ, causing EVS ε_k to approximate the time average of the raw EVS, making the smoothing effect more significant. Finally, we can obtain the magnitude or phase information of the EVS via (5) and utilize them as channel characteristics, respectively. In conclusion, the EVS is not only useful for making the phase

(a) (b)

(c) (d)

Fig. 5: Experimental setting includes a (a) commercial transmitter and a (b) receiver operating in OpenWiFi system. (c) Top-view layout. (d) Field trial scene.

information usable but it is also estimated by more symbols than CSI. Therefore, we intend to utilize the EVS as the channel feature in the device-free localization system to distinguish the location of a human in an indoor environment.

E. Deep Learning Classifier

Please note that due to space limitations, we do not provide a detailed methodology of the basis of deep neural networks in this paper. However, we would like to mention a few key points as follows. After processing the data, the amplitude or phase information of the EVS is used as input to the error vector based classifier. This classifier consists of two hidden layers of DNN. To address the vanishing gradients problem, we use the SeLU activation function instead of the commonly used ReLU function, due to its smoother function for differentiability [23]. The classifier has one output layer with the Softmax activation function, which calculates the probability of the human location. The loss function computes the loss between the label c and the predicted label ĉ using typical cross-entropy. Then, it implements the backpropagation mechanism. After the offline training stage, the well-trained model predicts the final result c_{pre} in the online session.

IV. PERFORMANCE EVALUATION The experimental setup consists of two Wi-Fi routers, one deployed as the transmitter and the other as the receiver. The experiment is conducted in a conference room, as shown in Fig.5. The transmitter in Fig. 5(a) is a commercial Wi-Fi router (TL- WDR 4300) operating at a sample rate of 100 Hz, with an Atheros chip, in access point mode. For the receiver in 5(b), we use a system-on-chip board (Xilinx ADRV9364-Z7020) running the OpenWiFi project [20] in monitor mode. Both routers operate at 5.22 GHz with a bandwidth of 20 MHz, using a singleinput single-output Wi-Fi transceiver system equipped with one antenna. The indoor experimental scene, shown in Fig. 5(c), is divided into 25 location spots, with a spacing of 0.75m × 0.75m.

(a) (b)

Fig. 6: The performance of EVAL with EVS amplitude and phase under different parameters of γ with respect to (a) average accuracy and (b) standard deviation.

Fig. 7: Performance comparison of four different input features of DNN.

A person stands still at each spot, as shown in Fig. 5(d). We collect a total of 4000 and 1000 packets for each label as training and testing data, respectively. In total, there are 26 different classification labels, including the empty room case.

Fig. 6 shows the average training accuracy over 50 training runs and its standard deviation (STD) against different calibration parameters γ. The yellow and tangerine colors represent the amplitude and phase information of the EVS as input training data, respectively. In Fig. 6(a), the vertical axis indicates the accuracy. It is observed that larger values of γ lead to higher accuracy by effectively smoothing out the AWGN effect in (22). The highest accuracy is achieved at γ = 4 and γ = 6 for the EVS amplitude and phase information, respectively. However, calibration does not work when γ = 0 according to (24). We can also infer that the accuracy of both data types decreases slightly with an increment of γ due to excessive smoothing, making the channel feature convergence indistinguishable and eventually leading to an overfitting model during the training phase. This phenomenon is also evident in Fig. 6(b), where the STD of accuracy increases with growing γ. As the amplitude and phase of the EVS can be trained independently, we have the flexibility to set the parameters individually. Based on our observations, we propose using γ values of 4 and 6 for the amplitude and phase of the EVS, respectively.

To verify the performance improvement achieved by EVAL, we collect CSI and I/Q data simultaneously during the experiment. Fig. 7 shows the performance comparison of four different input data types, including CSI amplitude/phase, as well as EVS amplitude/phase. All data types are individually fed into the same DNN learning network. According to Fig. 7, the EVS phase information outperforms the CSI one, indicating improved classification precision by removing RFO. Furthermore, the amplitude of the CSI

Fig. 8: Performance comparison of the proposed EVAL system with other existing benchmarks adopting machine learning methods with the aid of CSI/EVS amplitude/phase data.

in (13) is the same as that of EVS in (22) when the exponential term is removed. However, since EVS estimation employs more symbols than that CSI estimation, the EVS amplitude only provides a slight escalation in accuracy compared to that using CSI amplitude. As the phase information provides detail pertinent to the transmission distance, it is potentially more beneficial for indoor localization than amplitude information. Moreover, the EVS phase information provides higher accuracy than the EVS amplitude information.

Fig. 8 demonstrates the performance comparison of the proposed EVAL system and other existing benchmarks designed based on machine learning methods, including logistic regression (LR) [24], decision tree (DT) [25], random forest (RF) [8], support vector machine (SVM) [9], k-nearest neighbor (KNN) [15], and naive bayes (NB) [14]. The learning models mentioned above are fed with either CSI amplitude information or CSI phase information separately. Fig. 8 shows that the classification accuracy of CSI phase information is lower than that of CSI amplitude information, which confirms the presence of the RFO issue. In contrast, our proposed EVAL system not only utilizes more symbols for channel estimation but also eliminates the RFO problem, leading to higher accuracy compared to other existing methods.

V. CONCLUSION

This paper presents a novel method for improving the accuracy of device-free indoor localization using the proposed EVAL scheme in an OpenWiFi system compatible with existing WLANs. The EVS signal, extracted from the I/Q signals, enables the use of rich channel characteristics and eliminates the RFO problem in CSI-based algorithms. Our EVAL system includes a modulation classification and hard-decision decoding method to aid in the extraction of the EVS. Additionally, we propose a calibration method to reduce the effect of AWGN and inject the EVS into our DNN model. Experiments are performed to demonstrate that our proposed EVAL system outperforms conventional machine learning methods and existing device-free indoor localization systems. Overall, our approach provides a more accurate and robust solution for indoor localization, with significant practical implications for a variety of applications.

REFERENCES

[1] V. G. Moshnyaga, K. Hashimoto, and T. Suetsugu, “A Hardware Design of Camera-based User’s Presence Detector,” in Proc. IEEE International Conference on Systems, Man and Cybernetics (SMC), 2008, pp. 429–432.

[2] Z. Zhang, X. Gao, J. Biswas, and J. K. Wu, “Moving Targets Detection and Localization in Passive Infrared Sensor Networks,” in Proc. IEEE International Conference on Information Fusion (FUSION), 2007, pp. 1– 6. [3] L.-H. Shen, K.-T. Feng, and L. Hanzo, “Five Facets of 6G: Research Challenges and Opportunities,” ACM Computing Surveys, vol. 55, no. 11, pp. 1–39, 2023.

[4] W. Ruan, Q. Z. Sheng, L. Yao, T. Gu, M. Ruta, and L. Shangguan, “Devicefree Indoor Localization and Tracking Through Human-object Interactions,” in Proc. IEEE International Symposium on A World of Wireless, Mobile and Multimedia Networks (WoWMoM), 2016, pp. 1–9.

[5] B. Yang, L. Guo, R. Guo, M. Zhao, and T. Zhao, “A Novel Trilateration Algorithm for RSSI-based Indoor Localization,” IEEE Sensors Journal, vol. 20, no. 14, pp. 8164–8172, 2020.

[6] M. Heydariaan, H. Dabirian, and O. Gnawali, “AnguLoc: Concurrent Angle of Arrival Estimation for Indoor Localization with UWB Radios,” in Proc. IEEE International Conference on Distributed Computing in Sensor Systems (DCOSS), 2020, pp. 112–119.

[7] P. Dabove, V. Di Pietra, M. Piras, A. A. Jabbar, and S. A. Kazim, “Indoor Positioning Using Ultra-wide band (UWB) Technologies: Positioning Accuracies and Sensors’ Performances,” in Proc. IEEE/ION Position, Location and Navigation Symposium (PLANS), 2018, pp. 175–184.

[8] S. Abdul Samadh, Q. Liu, X. Liu, N. Ghourchian, and M. Allegue, “Indoor Localization Based on Channel State Information,” in Proc. IEEE Topical Conference on Wireless Sensors and Sensor Networks (WiSNet), 2019, pp. 1–4.

[9] Y.-M. Huang, A.-H. Hsiao, C.-J. Chiu, K.-T. Feng, and P.-H. Tseng, “Devicefree Multiple Presence Detection Using CSI With Machine Learning Methods,” in Proc. IEEE Vehicular Technology Conference (VTC), 2019, pp. 1–5.

[10] F.-Y. Chu, C.-J. Chiu, A.-H. Hsiao, K.-T. Feng, and P.-H. Tseng, “WiFi CSI-based Device-free Multi-room Presence Detection Using Conditional Recurrent Network,” in Proc. IEEE Vehicular Technology Conference (VTC), 2021, pp. 1–5.

[11] L.-H. Shen, K.-J. Chen, A.-H. Hsiao, and K.-T. Feng, “Semi- Supervised Bifold Teacher-Student Learning for Indoor Presence Detection Under Time-Varying CSI,” arXiv/2212.10802, 2022. [Online]. Available: https://arxiv.org/abs/2212.10802 [12] L.-H. Shen, C.-C. Hsieh, A.-H. Hsiao, and K.-T. Feng, “CRONOS:

Colorization and Contrastive Learning Enhanced NLoS Human Presence Detection using Wi-Fi CSI Signals,” arXiv/2211.10354, 2022. [Online]. Available: https://arxiv.org/abs/2211.10354 [13] C.-C. Hsieh, A.-H. Hsiao, C.-J. Chiu, and K.-T. Feng, “CSI Ratio with Coloring-assisted Learning for NLoS Motionless Human Presence Detection,” in Proc. IEEE Vehicular Technology Conference (VTC), 2022, pp. 1–5.

[14] Z. Wu, Q. Xu, J. Li, C. Fu, Q. Xuan, and Y. Xiang, “Passive Indoor Localization Based on CSI and Naive Bayes Classification,” IEEE Transactions on Systems, Man, and Cybernetics: Systems, vol. 48, no. 9, pp. 1566–1577, 2018.

[15] A. Sobehy, E. Renault, and P. Muhlethaler, “CSI-MIMO: K-nearest Neighbor Applied to Indoor Localization,” in Proc. IEEE International Conference on Communications (ICC), 2020, pp. 1–6.

[16] L.-H. Shen, K.-H. Liao, and K.-T. Feng, “Queue-Aware Uplink Arbitrationbased Contention and Downlink Resource Allocation for Multi-APs for IEEE 802.11ax WLANs,” in Proc. IEEE Wireless Communications and Networking Conference (WCNC), 2022, pp. 1755–1760.

[17] E. Khorov, I. Levitsky, and I. F. Akyildiz, “Current Status and Directions of IEEE 802.11be, the Future Wi-Fi 7,” IEEE Access, vol. 8, pp. 88 664–88 688, 2020.

[18] C. Chen, H. Song, Q. Li, F. Meneghello, F. Restuccia, and C. Cordeiro, “Wi-Fi Sensing Based on IEEE 802.11bf,” IEEE Communications Magazine, vol. 61, no. 1, pp. 121–127, 2023.

[19] E. Reshef and C. Cordeiro, “Future Directions for Wi-Fi 8 and Beyond,” IEEE Communications Magazine, vol. 60, no. 10, pp. 50–55, 2022.

[20] X. Jiao, W. Liu, M. Mehari, M. Aslam, and I. Moerman, “OpenWiFi: A Free and Open-source IEEE 802.11 SDR Implementation on SoC,” in Proc. IEEE Vehicular Technology Conference (VTC). IEEE, 2020, pp. 1–2.

[21] E. Sourour, H. El-Ghoroury, and D. McNeill, “Frequency Offset Estimation and Correction in the IEEE 802.11a WLAN,” in Proc. IEEE Vehicular Technology Conference (VTC), vol. 7, 2004, pp. 4923–4927 Vol. 7.

[22] J. P. Mouton, M. Ferreira, and A. S. Helberg, “A Comparison of Clustering Algorithms for Automatic Modulation Classification,” Expert Systems with Applications, vol. 151, p. 113317, 2020.

[23] A. Nguyen, K. Pham, D. Ngo, T. Ngo, and L. Pham, “An Analysis of Stateof-the-art Activation Functions for Supervised Deep Neural Network,” in Proc. IEEE International Conference on System Science and Engineering (ICSSE), 2021, pp. 215–220.

[24] C. Xiang, Z. Zhang, S. Zhang, S. Xu, S. Cao, and V. Lau, “Robust Sub-meter Level Indoor Localization - A Logistic Regression Approach,” in Proc. IEEE International Conference on Communications (ICC), 2019, pp. 1–6.

[25] J. Ding and Y. Wang, “WiFi CSI-based Human a Recognition Using Deep Recurrent Neural Network,” IEEE Access, vol. 7, pp. 174 257–174 269, 2019.