arXiv:astro-ph/0109009v1 2 Sep 2001

Optical Observations of the Dark Gamma-Ray Burst GRB 000210

Javier Gorosabel^1, Jens Hjorth^2, Holger Pedersen^2, Brian L. Jensen^2, Lisbeth F. Olsen^2, Lise Christensen^2, Evencio Mediavilla^3, Rafael Barrena^3, Johan U. Fynbo^4, Michael I. Andersen^5, Andreas O. Jaunsen^4, Stephen Holland^6, and Niels Lund^1

1 Danish Space Research Institute, Juliane Maries Vej 30, DK-2100 Copenhagen Ø, Denmark 2 Astronomical Observatory, University of Copenhagen, Juliane Maries Vej 30, DK-2100 Copenhagen Ø, Denmark 3 Instituto de Astrofísica de Canarias, E-38200 La Laguna, Tenerife, Canary Islands, Spain 4 European Southern Observatory, Karl-Scwharzschild-Straße, D-85748 Garching, Germany 5 Division of Astronomy, P.O. Box 3000, FIN-90014 University of Oulu, Finland 6 Department of Physics, University of Notre Dame, Notre Dame, IN 46556-5670, USA

Abstract. We report on optical observations on GRB 000210 obtained with the 2.56- m Nordic Optical Telescope and the 1.54-m Danish Telescope starting 12.4 hours after the gamma-ray event. The content of the X-ray error box determined by the Chandra satellite is discussed.

1 Introduction

The BeppoSAX Gamma Ray Burst Monitor and the Wide Field Camera (unit 1) observed a strong gamma-ray burst on 2000 February 10.36396 UT. It exhibited an X-ray flux of 7.4 Crab (2-26 keV) and a duration of ∼ 20s [11]. The field was observed by the Chandra X-ray satellite approximately 21 hours after the GRB [3,4] which localised an uncataloged X-ray source to within 2^{′′}. The position was consistent with the one derived independently by BATSE, IPN and the Narrow- Field Instruments (NFI) on-board BeppoSAX [9,8,2]. The Chandra position was improved and the X-ray error box reduced to a circle of 1.6^{′′} radius [5]. Optical observations obtained with the 1.54-m Danish Telescope (1.54D) on 2000 Feb. 11.03-11.08 UT (∼ 16 hours after the burst) revealed an object coincident with the X-ray error box determined by Chandra [6]. These optical observations are part of the results reported in this paper. Deep radio follow-up observations starting 14.8 hours after the gamma-ray event, did not find any radio emission associated to the afterglow above 55 microJy [1,10].

2 Gorosabel et al.

2 Observations

We obtained optical observations with the 2.56-m Nordic Optical Telescope (NOT) and the 1.54D starting 12.4 hours and 16 hours after the burst, respectively. The NOT observations were carried out with HIRAC and at the 1.54D with the DFOSC instrument. Table 1 displays the observing log.

Table 1. List of the observations obtained with NOT and 1.54D Telescopes.

Date 2000(UT) Filter Exposure Time Seeing Telescope Feb. 10.88 - 10.90 R 3x300 1.2 NOT Feb. 11.03 - 11.08 R 10x300 1.6 1.54D Feb. 14.02 - 14.03 R 600 1.9 1.54D May 5.42 - 5.44 R 2x600 2.3 1.54D Aug. 22.29 - 22.41 R 7x900 2.2 1.54D Aug. 23.23 - 23.29 R 5x900 2.3 1.54D Aug. 24.23 - 24.30 R 4x900 3.0 1.54D Aug. 26.29 - 26.43 V 9x900 1.5 1.54D Aug. 27.21 - 27.24 I 2x900 1.4 1.54D Aug. 28.21 - 28.24 I 2x1200 1.4 1.54D Aug. 29.21 - 29.30 I 7x1200 1.1 1.54D Aug. 30.22 - 30.24 I 1200 1.1 1.54D Aug. 31.21 - 31.24 B 2x1200 1.5 1.54D

The observations carried out in August improved the previous position reported in February [6], yielding α_{J2000} = 01^h59^m15.60^s, δ_{J2000} = −40^∘39^′32.8^{′′} with an uncertainty of ±1^{′′} [7]. This position is fully consistent with the improved Chandra X-ray circle position [5] (see Fig 1). The first images taken at NOT were not deep enough to detect the object. A comparison of the co-added R-band image taken on Aug 22.29– 24.30 UT with the R-band image taken 16 hours after the burst gives a magnitude difference of 0.03 ± 0.30 mag. Therefore, the object remains constant in brightness within the photometric errors. We derive a magnitude of R = 23.5 ± 0.2 for the object.

3 Conclusion

Although the object is very faint in our images its appearance is not stellar. The photo-profiles shows an object slightly elongated in the North-East direction with an angular extension of ∼1.5^{′′}. The angular size in the orthogonal direction (North-West) is limited by the seeing (1.1^{′′} in our best images). The object did not change in brightness since the first detection carried out just 16 hours after the burst. GRB 000210 appears to be one of the best candidates to study the problem of the “dark burst”, resembling GRB 970828. It would be extremely important to perform deep optical/IR observations aimed to determine the redshift, the spectral energy distribution and the morphology of this enigmatic object.

Optical Observations of the GRB 000210 Error Box 3

Fig. 1. The figure shows a blow up of the co-added R-band image taken on Aug 22.29– 24.30 UT. The plot shows the position of the improved Chandra X-ray circle [5] and the optical candidate [7].

Acknowledgments

Javier Gorosabel acknowledges the receipt of a Marie Curie Research Grant from the European Commission.

References

1. Berger, E., et al. 2000, GCN 546. 2. Costa, E., et al. 2000, GCN 553. 3. Garcia, M., et al. 2000, GCN 544. 4. Garcia, M., et al. 2000, GCN 548. 5. Garmire, G., et al. 2000, GCN 782. 6. Gorosabel, J., et al. 2000, GCN 545. 7. Gorosabel, J., et al. 2000, GCN 783. 8. Hurley, K., et al. 2000, GCN 543. 9. Kippen, R.M., et al. 2000, GCN 549. 10. McConnell, D., et al. 2000, GCN 560. 11. Stornelly, M., et al. 2000, CCN 540.